{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"PAYERIDENT","type":"character","width":50},{"name":"FIO","type":"character","width":50},{"name":"COMPANYCOD","type":"character","width":15},{"name":"SERVICECOD","type":"character","width":15},{"name":"LS","type":"character","width":12},{"name":"SUM","type":"number","width":8,"decimals":2}],"n_rows":2,"rows_kept":2,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["1111111111","\u0098¥¢ç¥­ª® \u0092 à á \u0083à¨£®à®¢¨ç","1","1","1111111111",1.00]
["2222222222","\u008a®á ç-\u008a¢iâª  \u008b à¨á  \u008f¥âài¢­ ","1","1","1234567890",100.00]